The HERA-B Hardware Trigger in 1999

DRAFT as of : February 8, 2000

Ekkehard K E Gerndt^1 DESY, Notkestr. 85, D-22603 Hamburg, Germany

For the HERA-B Collaboration

Abstract

HERA-B is located at DESY, Germany. The HERA-B hardware trigger aims to find J/ψ’s within 12 μs. The trigger performs fast online track reconstruction, determines particle momenta, and calculates the invariant mass of track pairs. An overview of the hardware trigger and a review of the status as of fall 1999 is given.

1 gerndt@mail.desy.de