HERA-B 99-232 VDET 99-016 November 1999

The HERA-B Vertex Detector:

First Results from Detector Commissioning

Wolfgang Wagner^1

Max-Planck-Institut für Physik, Föhringer Ring 6, 80805 München, Germany

For the HERA-B Collaboration

Abstract

An overview of the design of the HERA-B vertex detector is presented. During the 1998/99 commissioning run 25% of the system was instrumented. First results from this data taking period are shown.

1wagner@mppmu.mpg.de