T. Oest P RC Open Session 8 /7/98 1

Electromagne tic Calorimeter

ECAL design:

shashlik calorimeter ΔE/E ≈ (17−9.5) % / E^{1/2} Δx,y ≈ 1.2−10 mm 1−3 � h → e misidentification ≈ 1 � with TR D

Installati on Status :

ECAL modules installed readout: 60 boards at DESY 1/2 by Octobe r pretrigger: 20 boards by August 1/2 by Octobe r fully operational for 1999

Pb/scintillator

W/scintillator

Mass (γγ) [GeV]

1997 run 2 x 96 modules N

T. Oest P RC Open Session 8 /7/98 2

Muon System

Muon chambers:

Superlayer # layers Pretr igger L1 trigger 1998 installatio n

MU1 3 wires installed

MU2 3 1999

MU3 1 pads wires 1/2½ in August

MU4 1 pads wires 1/2 in August

Pretrigger:

design finished test series production by industry

2 slices (10 %) ready by November full system for 1999

Trigger board

T. Oest P RC Open Session 8 /7/98 3

Ring Imaging Che renkov Counter

RICH design: C4F10 radiator 4 or 16 channel photomultiplier K/π separation from 5- 50 GeV Installation Status: installation completed stand alone tracking for 1998 single interaction