Short (High current) High current at HV = 1000 - 1600 V High current - Only after closing 03.07.99 New bad group at Hall West 07.07.99

-125 -100 -75 -50 -25 0 25

825

830

835

840

845

OTR Quadrant -P4- 23.07.99 18:25

Scheme of HV cables

1_{01 0102}^{p4-1-0410-} 01 04 02- 05 04 p4-1-05

06- 05 08 02- 09 08 p4-1-06

06- 09 12 02-

13 12 p4-1-07

06- 15 14 p4-1-08

02- 18 17 p4-1-10 02-

2 01

20 p4-1-12 02-

01 02 p4-2-04 10-

01 04 02- 05 04 p4-2-05

06- 05 08 02- 09 08 p4-2-06

06- 09 12 02-

13 12 p4-2-07

06- 16 15 p4-2-08

02- 18 17 p4-2-10 02-

3 01

21 p4-2-12 02-

01 02 p4-3-04 10-

01 04 02- 05 04 p4-3-05

06- 05 08 02- 09 08 p4-3-06

06- 09 12 02-

13 12 p4-3-07

06- 15 14 p4-3-08

02- 18 17 p4-3-10 02-

4_1 3

2

4 4-04 1

3

2

4 4-05 1 5 2 6 3 7 4 8 4-06 1 5 2 6 3 7 4 8 4-07 1 5 2 6 3 7 4 8 4-08 1 5 2 6 3 7 4 8 4-09 1 3 2 4 4-10 1 3 2 4 4-11_1^4_2^5_3^64-12_1^3_2^44-14_1^3_2^44-16

5_1 3

2

4 5-04 1 5 2 6 3 7 4 8 5-05 1 5 2 6 3 7 4 8 5-06 1 5 2 6 3 7 4 8 5-07 1 5 2 6 3 7 4 8 5-08 1 4 2 5 3 6 5-09 1 4 2 5 3 6 5-10_1^3_2^45-11_1^4_2^5_3^65-13_1^5_2^6_3^7_4^85-15

6_1 3

2

4 6-04 1 5 2 6 3 7 4 8 6-05 1 5 2 6 3 7 4 8 6-06 1 5 2 6 3 7 4 8 6-07 1 5 2 6 3 7 4 8 6-08 1 5 2 6 3 7 4 8 6-09 1 5 2 6 3 7 4 8 6-10_1^4_2^5_3^66-11_1^3_2^46-13_1^5_2^6_3^7_4^86-15

Number of cables: 300