-80 -60 -40 -20 0 20

316

318

320

322

324

326

Stereo layer

OTR Quadrant -M3+^{15.04.99 16:26}

View from the top .

1_{1-09-011-09-02}

1-01-01

m3-1-01(26cm)

1-01-02

1-01-03

1-05-01

m3-1-02(20cm)

1-05-02

1-05-03 1-01-04

m3-1-02(21cm)

1-01-05

1-01-06

1-05-04

m3-1-03(19cm)

1-05-05

1-05-06 1-01-07

m3-1-03(20cm)

1-01-08

1-01-09

1-01-10

2_{2-09-01}

m3-1-05(24cm)

2-09-02

2-01-01

m3-2-01(21cm)

2-01-02 2-01-03

2-05-01

m3-2-02(19cm)

2-05-02

2-05-03 2-01-04

m3-2-02(20cm)

2-01-05

2-01-06

2-05-04

m3-2-03(19cm)

2-05-05

2-05-06 2-01-07

m3-2-03(19cm)

2-01-08

2-01-09

2-01-10

3_{3-09-01}

m3-2-05(28cm)

3-09-02

3-01-01

m3-3-01(20cm)

3-01-02

3-01-03

3-05-01

m3-3-02(19cm)

3-05-02

3-05-03 3-01-04

m3-3-02(19cm)

3-01-05

3-01-06

3-05-04

m3-3-03(20cm)

3-05-05

3-05-06 3-01-07

m3-3-03(20cm)

3-01-08

3-01-09

3-01-10

m3-3-05(33cm)

Number of cables: 54

-80 -60 -40 -20 0 20

316

318

320

322

324

326

Stereo layer

OTR Quadrant -M3-^{15.04.99 16:26}

View from the bottom .

1_{1-10-01 1-10-02 1-02-01}

m3-1-01(22cm)

1-02-02 1-02-03 1-06-01

m3-1-02(20cm)

1-06-02 1-06-03

1-02-04

m3-1-02(20cm)

1-02-05 1-02-06 1-06-04

m3-1-03(21cm)

1-06-05 1-06-06 1-02-07

m3-1-03(20cm)

1-02-08 1-02-09 1-02-10

2_{2-10-01}

m3-1-04(33cm)

2-10-02 2-02-01

m3-2-01(21cm)

2-02-02 2-02-03 2-06-01

m3-2-02(20cm)

2-06-02 2-06-03

2-02-04

m3-2-02(19cm)

2-02-05 2-02-06 2-06-04

m3-2-03(19cm)

2-06-05 2-06-06 2-02-07

m3-2-03(19cm)

2-02-08 2-02-09 2-02-10

3_{3-10-01}

m3-2-04(28cm)

3-10-02 3-02-01

m3-3-01(20cm)

3-02-02 3-02-03 3-06-01

m3-3-02(20cm)

3-06-02 3-06-03

3-02-04

m3-3-02(20cm)

3-02-05 3-02-06 3-06-04

m3-3-03(19cm)

3-06-05 3-06-06 3-02-07

m3-3-03(19cm)

3-02-08 3-02-09 3-02-10

m3-3-04(24cm)

Number of cables: 54

20 40 60 80

316

318

320

322

324

326

328

Stereo layer

OTR Quadrant +M3+^{15.04.99 16:26}

View from the top .

1_{1-01-11}^{1-02-11m3-1-06(31cm)}

1-03-01

m3-1-06(32cm)

1-03-02

1-03-03 1-04-01

m3-1-07(38cm)

1-04-02

1-04-03

1-01-12

m3-1-07(37cm)

1-01-13

1-01-14

1-02-12

m3-1-08(27cm)

1-02-13

1-02-14

1-03-04

m3-1-08(28cm)

1-03-05 1-03-06 1-04-04

m3-1-09(41cm)

1-04-05

1-04-06

1-01-15

m3-1-09(40cm)

1-01-16

1-01-17

1-02-15

m3-1-10(30cm)

1-02-16

1-02-17

1-07-01

m3-1-10(30cm)

1-07-02

1-08-01

m3-1-11(35cm)

1-08-02

2_{2-01-11}

m3-1-11(34cm)

2-02-11

m3-2-06(26cm)

2-03-01

m3-2-06(27cm)

2-03-02

2-03-03 2-04-01

m3-2-07(33cm)

2-04-02

2-04-03

2-01-12

m3-2-07(32cm)

2-01-13

2-01-14

2-02-12

m3-2-08(23cm)

2-02-13

2-02-14

2-03-04

m3-2-08(23cm)

2-03-05

2-03-06 2-04-04

m3-2-09(36cm)

2-04-05

2-04-06

2-01-15

m3-2-09(35cm)

2-01-16

2-01-17

2-02-15

m3-2-10(25cm)

2-02-16

2-02-17

2-07-01

m3-2-10(26cm)

2-07-02

2-08-01

m3-2-11(30cm)

2-08-02

3_{3-01-11}

m3-2-11(29cm)

3-02-11

m3-3-06(21cm)

3-03-01

m3-3-06(22cm)

3-03-02

3-03-03 3-04-01

m3-3-07(28cm)

3-04-02

3-04-03

3-01-12

m3-3-07(28cm)

3-01-13

3-01-14

3-02-12

m3-3-08(20cm)

3-02-13

3-02-14

3-03-04

m3-3-08(21cm)

3-03-05

3-03-06 3-04-04

m3-3-09(31cm)

3-04-05

3-04-06

3-01-15

m3-3-09(30cm)

3-01-16

3-01-17

3-02-15

m3-3-10(22cm)

3-02-16

3-02-17

3-07-01

m3-3-10(22cm)

3-07-02

3-08-01

m3-3-11(26cm)

3-08-02

m3-3-11(24cm)

Number of cables: 90