-300

-250 -200

-150 -100 -50 0

1310

1312

1314

1316

1318

1320

1322

Stereo

layer

OTR Quadrant -T2+^{15.07.98 14:39}

View from the top .

1_{0103 02}

t2-1-01

09-(24cm)

07 06

t2-1-02

09-(24cm)

11 10

t2-1-03

09-(25cm)

15 14

t2-1-04

09-(26cm)

19 18

t2-1-05

09-(26cm)

01

22

t2-1-06

09-(22cm)

01

06

t2-1-07

01-(23cm) 07

06

t2-1-08

05-(20cm)

07

14

t2-1-09

01-(23cm) 15

14

t2-1-10

05-(21cm)

15

22

t2-1-11

01-(23cm) 23

22

t2-1-12

05-(20cm)

23

30

t2-1-13

01-(22cm) 31

30

t2-1-14

05-(20cm)

31

34

t2-1-15

01-(21cm) 35

34

t2-1-16

05-(22cm)

3938

t2-1-18

01-(21cm)

2_{01}

44

t2-1-20

01-(26cm)

05 04

t2-2-01

09-(21cm)

09 08

t2-2-02

09-(21cm)

13 12

t2-2-03

09-(21cm)

17 16

t2-2-04

09-(22cm)

21 20

t2-2-05

09-(23cm)

01

24

t2-2-06

09-(21cm)

01

08

t2-2-07

01-(22cm)

09

08

t2-2-08

05-(25cm) 09

16

t2-2-09

01-(23cm)

17

16

t2-2-10

05-(26cm) 17

24

t2-2-11

01-(23cm)

25

24

t2-2-12

05-(27cm) 25

30

t2-2-13

01-(32cm)

31

30

t2-2-14

05-(23cm)

3534

t2-2-16

01-(28cm)

3_{01}

41

t2-2-18

01-(35cm)

05 04

t2-3-01

09-(23cm)

09 08

t2-3-02

09-(23cm)

13 12

t2-3-03

09-(24cm)

17 16

t2-3-04

09-(25cm)

21 20

t2-3-05

09-(25cm)

01

24

t2-3-06

09-(27cm)

01

08

t2-3-07

01-(25cm) 09

08

t2-3-08

05-(22cm) 09

16

t2-3-09

01-(24cm) 17

16

t2-3-10

05-(21cm) 17

24

t2-3-11

01-(23cm) 25

24

t2-3-12

05-(21cm) 25

32

t2-3-13

01-(33cm) 33

32

t2-3-14

05-(23cm)

3736

t2-3-16

01-(39cm) 42 01-(51cm)

t2-3-18

Number of cables: 293

-300 -250 -200 -150 -100 -50 0 50

1310

1312

1314

1316

1318

1320

1322

Stereo layer

OTR Quadrant -T2-^{15.07.98 14:39}

View from the bottom .

1_{01 0504}

t2-1-01

10-(25cm) 09 08

t2-1-02

10-(24cm) 13 12

t2-1-03

10-(24cm) 17 16

t2-1-04

10-(23cm) 21 20

t2-1-05

10-(23cm)

01

24

t2-1-06

10-(23cm)

01

06

t2-1-07

06-(25cm) 07

06

t2-1-08

02-(22cm)

07

14

t2-1-09

06-(24cm) 15

14

t2-1-10

02-(22cm)

15

22

t2-1-11

06-(23cm) 23

22

t2-1-12

02-(22cm)

23

30

t2-1-13

06-(23cm) 31

30

t2-1-14

02-(23cm)

31

34

t2-1-15

06-(22cm) 35

34

t2-1-16

02-(21cm)

39 38

t2-1-17

02-(27cm) 45 44

t2-1-19

02-(39cm)

2_{01}

48

t2-1-21

02-(45cm)

05 04

t2-2-01

10-(21cm) 09 08

t2-2-02

10-(21cm) 13 12

t2-2-03

10-(21cm) 17 16

t2-2-04

10-(22cm) 21 20

t2-2-05

10-(23cm)

01

24

t2-2-06

10-(19cm)

01

08

t2-2-07

06-(26cm)

09

08

t2-2-08

02-(22cm) 09

16

t2-2-09

06-(25cm)

17

16

t2-2-10

02-(22cm) 17

24

t2-2-11

06-(24cm)

25

24

t2-2-12

02-(21cm) 25

30

t2-2-13

06-(23cm)

31

30

t2-2-14

02-(21cm)

35 34

t2-2-15

02-(22cm)

41 40

t2-2-17

02-(28cm)

3_{01}

47

t2-2-19

02-(35cm)

05 04

t2-3-01

10-(25cm) 09 08

t2-3-02

10-(24cm) 13 12

t2-3-03

10-(24cm) 17 16

t2-3-04

10-(23cm) 21 20

t2-3-05

10-(23cm)

01

24

t2-3-06

10-(22cm)

01

08

t2-3-07

06-(21cm) 09

08

t2-3-08

02-(24cm) 09

16

t2-3-09

06-(23cm) 17

16

t2-3-10

02-(21cm) 17

24

t2-3-11

06-(22cm) 25

24

t2-3-12

02-(22cm) 25

32

t2-3-13

06-(22cm) 33

32

t2-3-14

02-(22cm)

37 36

t2-3-15

02-(21cm) 43 42

t2-3-17

02-(25cm) 50 02-(26cm)

t2-3-19

Number of cables: 313

0 50 100 150 200 250 300

1310

1312

1314

1316

1318

1320

1322

Stereo

layer

OTR Quadrant +T2+^{15.07.98 14:39}

View from the top .

1_{450146}^{01-(25cm)} 01

02

t2-1-22

04-(24cm)

47

04

t2-1-23

03-(23cm)

03

50

t2-1-24

01-(25cm)

05

08

t2-1-25

04-(26cm)

51

12

t2-1-26

03-(23cm)

13

58

t2-1-27

01-(22cm) 59

20

t2-1-28

03-(23cm)

21

66

t2-1-29

01-(21cm) 67

28

t2-1-30

03-(23cm)

29

74

t2-1-31

01-(21cm) 75

34

t2-1-32

03-(21cm) 01

80

t2-1-33

01-(21cm)

05 04

t2-1-34

07-(22cm)

09 08

t2-1-35

07-(23cm)

13 12

t2-1-36

07-(24cm)

17 16

t2-1-37

07-(24cm)

21 20

t2-1-38

07-(25cm)

2_{42}

24

t2-1-39

07-(26cm)

0143

01-(18cm)

01

04

t2-2-20

04-(22cm)

44

06

t2-2-21

03-(20cm)

05

49

t2-2-22

01-(23cm)

07

10

t2-2-23

04-(22cm)

50

14

t2-2-24

03-(23cm) 15

57

t2-2-25

01-(21cm)

58

22

t2-2-26

03-(21cm) 23

65

t2-2-27

01-(21cm)

66

30

t2-2-28

03-(21cm) 01

73

t2-2-29

01-(22cm)

05 04

t2-2-30

07-(19cm)

09 08

t2-2-31

07-(23cm)

13 12

t2-2-32

07-(22cm)

17 16

t2-2-33

07-(21cm)

21 20

t2-2-34

07-(20cm)

3_{43}

24

t2-2-35

07-(21cm)

0144

01-(18cm)

01

06

t2-3-20

04-(21cm)

45

08

t2-3-21

03-(21cm)

07

52

t2-3-22

01-(24cm)

09

12

t2-3-23

04-(23cm)

53

16

t2-3-24

03-(25cm) 17

60

t2-3-25

01-(21cm) 61

24

t2-3-26

03-(20cm) 25

68

t2-3-27

01-(21cm) 69

32

t2-3-28

03-(20cm) 01

76

t2-3-29

01-(20cm)

05 04

t2-3-30

07-(23cm)

09 08

t2-3-31

07-(23cm)

13 12

t2-3-32

07-(24cm)

17 16

t2-3-33

07-(24cm)

21 20

t2-3-34

07-(25cm) 24 07-(26cm)

t2-3-35

Number of cables: 300

50 100 150 200 250 300

1310

1312

1314

1316

1318

1320

1322

Stereo layer

OTR Quadrant +T2-^{15.07.98 14:40}

View from the bottom .

1_{49} 55

54

t2-1-25

02-(19cm)

09

58

t2-1-26

02-(21cm)

59

12

t2-1-27

04-(22cm) 13

66

t2-1-28

02-(22cm)

67

20

t2-1-29

04-(21cm) 21

74

t2-1-30

02-(22cm)

75

28

t2-1-31

04-(21cm) 29

80

t2-1-32

02-(20cm) 01

34

t2-1-33

04-(20cm)

05 04

t2-1-34

08-(22cm) 09 08

t2-1-35

08-(26cm) 13 12

t2-1-36

08-(25cm) 17 16

t2-1-37

08-(25cm) 21 20

t2-1-38

08-(24cm)

2_{48}

22

t2-1-39

08-(24cm)

54

53

t2-2-23

02-(20cm)

11

57

t2-2-24

02-(20cm) 58

14

t2-2-25

04-(19cm)

15

65

t2-2-26

02-(21cm) 66

22

t2-2-27

04-(20cm)

23

73

t2-2-28

02-(20cm) 01

30

t2-2-29

04-(22cm)

05 04

t2-2-30

08-(23cm) 09 08

t2-2-31

08-(23cm) 13 12

t2-2-32

08-(22cm) 17 16

t2-2-33

08-(21cm) 21 20

t2-2-34

08-(20cm)

3_{51}

24

t2-2-35

08-(21cm)

57

56

t2-3-23

02-(22cm)

13

60

t2-3-24

02-(20cm) 61

16

t2-3-25

04-(20cm) 17

68

t2-3-26

02-(21cm) 69

24

t2-3-27

04-(20cm) 25

76

t2-3-28

02-(22cm) 01

32

t2-3-29

04-(21cm)

05 04

t2-3-30

08-(25cm) 09 08

t2-3-31

08-(25cm) 13 12

t2-3-32

08-(24cm) 17 16

t2-3-33

08-(23cm) 21 20

t2-3-34

08-(23cm) 24 08-(22cm)

t2-3-35

Number of cables: 220