Figure 11: The pad sizes and relative positions of pads in the RUN-98 3rd and 4th muon superlayers.

References

[1] T. Lohse et al., HERA-B collaboration, An Experiment to Study CP Violation in the B System Using the Internal Target at the HERA Proton Ring, Proposal, DESY-PRC 94/02, May 1994.

[2] E. Hartouni et al., HERA-B collaboration, An Experiment to Study CP Violation in the B System Using the Internal Target at the HERA Proton Ring, Design Report, DESY-PRC 95/01, January 1995.

[3] Yu. Zaitsev, HERA-B Collaboration Meeting, February 3rd-7th, 1997. Muon Session - Morning, HERA-B note 97-031

Figure 12: Numbering of pads in superlayer 3.